HONMAX 25 Different intervals Timing and 3D Pedometer, Clock, 9 Sets of Alarm Clocks, Stopwatch/Black

3+INT can set 3 to 25 groups of interval time, and can repeat the cycle up to 99 times. It can be applied to complex sports training.
2INT can set a group or 2 groups of intermittent timing, and it repeats the cycle up to 99 times.
The perpetual calendar clock can set up to 9 groups of alarms, and the alarm duration(chime and vibration) can be selected from 5 seconds, 10 seconds, 20 seconds, 30 seconds, and 60 seconds.
Has a stopwatch function. With 3D step counting function, the maximum step count is 99999 steps, and the number of steps needs to be manually reset.
In 2 INT and 3+INT chime and vibration interval notification; alarm duration can be set for one, two, five, or nine seconds.
The timer is waterproof IP66. The timer has a built-in lithium battery, which can stand by for several months after a single charge. Built-in backlight, can be used in dim environment.
In 2 INT and 3+ INT modes, three sets of settings p1, p2, and p3 can be saved respectively.