TEKMAGIC 10ATM Waterproof Sport Watch for Swimming Diving with Stopwatch, 12/24 Hour Format, Dual Time Zone, Alarm Functions (2019 Version)

Key Features:

-Precise display of hour, minute, second, date, day and month.

-10 ATM water resistant grade support up to 100 meters (328feet) underwater operation.

-12/24 hour format selectable.

-Positive electro luminescent backlights built-in.

-Support dual time zone display.

-Support hourly chime function.

-Support stopwatch function.

-Support countdown timer function.

-Support time alarm setup.

-Support shock resistant.

-Support full auto calendar.

-With comfortable soft PU band strap.

Parameters:

– Time Accuracy: ±30 seconds per month

-Dive Maximum Operating Depth: 100m (10ATM)

-Countdown Range: 23:59’59” to 0:0’0”

-Watch Shape: Round

-Movement: Digital

-Battery Code: CR2025

-Operating Battery Life Time: 1.5 to 2 years

-Dial Window Material: High Transparency Resin

-Watch Case Material: ABS Plastic

-Dial Color: Black

-Case Diameter: 45 mm

-Case Thickness: 17 mm

-Watchband Material: PU

-Band Color: Black

-Clasp: Pin Buckle

-Band Width: 20mm

-Maximum Wrist Circumference: 208mm

-Minimum Wrist Circumference: 152mm

-Product Weight: 55g

-Package Weight: 114g

Note: The battery is replaceable. If you find that the watch is not working or the text on the display is not clear, please replace the watch battery in time.