CASIO HS-80TW-1JH Stopwatch, Soccer, Lap Time, Split Measurement, 2 Memory, Water Resistant to 5 ATM, Operation Sound, Switching, Black, Black (Black 19-3911tcx), 83×64×24mm

This stopwatch is made with 5 ATM water resistance that can be used safely in the water, such as pools and oceans.
Up to 100 lap and split data can be used for 2 sets of memory.
Features include soccer compatible stopwatch and interval measurement timer.
Features an ON/OFF function that can cancel the sound of operation.
Display time and calendar
Easy to grip body shape with fins in the center
Battery Life: Approx. 5 years.

Product Size (H x W x Thickness): Approx. 3.3 x 2.5 x 0.9 inches (8.3 x 6.4 x 2
Weight: Approx. 3.1 oz (85 g)
Material: Resin
Country of Origin: China
Functions: Stopwatch (1/1000 second, 10 hour scale (normal measurement, accumulative measurement, lap split measurement, 1-100 time), lap split up to 100 memory, soccer stopwatch (referee additive timer), interval measurement timer, alarm function, counter function, time and calendar display, operation tone on/off function, full auto calendar. Return function, 12/Switch between 24-hour displays
Power Supply: Button battery CR2032 x 1 (battery life is approx. 5 years)
Accessories: Instruction manual (English language not guaranteed), CR2032 button battery x 1